			   ┌──────────────────────┐
			   │ ANCLOCK Version 7:8w │
			   └──────────────────────┘
		     Here is a list of the function keys.

F1   Help (Displays this screen)
F3   Chimes on/off (Enables or disables the 1/4 Hr chimes)
F4   Test (or demonstrate) chimes 
F5   Test (or demonstrate) reminder
F6   Set time
F7   Set date
F8   Set reminder. (Puts a message up on the screen at the time 
     specified. Reminder only works while Anclock is running)
F10  (or press Esc) Exit to DOS

		      Press Esc to return to clock face.

Written by Roly Williams, this update 20-2-91. This is Shareware. You are
invited to copy and distribute it freely, provided it is unmodified and no
charge is made other than the cost of copying and distribution. Any donations
to the author will be remembered and much appreciated. Any donation enclosing
an empty disk and SAE, will get you a copy of the latest version.

Roly Williams, 22 Morrison Drive, Lennoxtown, Strathclyde, G65 7BA
